p (GeV/c)

0 5 10 15 20 25 30

(deg.) θ

0

5

10

15

20

25

30 fhGammaThetaVsP

Entries 14121 Mean x 2.635 Mean y 12.04 RMS x 2.596 RMS y 7.657

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

(1/bin) γ Primary