fhGammaTheta Entries 14121 Mean 21.24 RMS 19.22

(deg.) θ 0 10 20 30 40 50 60 70 80 90

N (1/bin)

0

0.1

0.2

0.3

0.4

0.5

0.6 γ UrQMD, Au+Au 25 AGeV, primary fhGammaPt

Entries 14121 Mean 0.3451 RMS 0.2357

(GeV/c) tp 0 1 2 3 4 5 6 7 8 9 10

N (1/bin)

-3 10

-2 10

-1 10

1

fhGammaPt γ UrQMD, Au+Au 25 AGeV, primary

fhGammaP

Entries 14121 Mean 2.037 RMS 2.427

p (GeV/c)

0 10 20 30 40 50 60 70 80

N (1/bin)

-3 10

-2 10

-1 10

1

10 γ UrQMD, Au+Au 25 AGeV, primary fhGammaY

Entries 14121 Mean 1.991 RMS 1.135

y -3 -2 -1 0 1 2 3 4 5 6 7

N (1/bin)

0

0.2

0.4

0.6

0.8

1 fhGammaY γ UrQMD, Au+Au 25 AGeV, primary